UPDATE "User" SET "passwordHash" = '$2b$12$W79XaxCcUvrSFDg6rY7/8ebMFZD7RsD1OSHYvIUeftzZL9blvTI8q', "mustSetPassword" = false WHERE email = 'admin@monaco-opc.com';
